Rosanna Train Station by MGS wins Australian Urban Design Award

Yet another award for the Rosanna Train Station by MGS Architects. Well done!

Click here to view the full project gallery.

The post Rosanna Train Station by MGS wins Australian Urban Design Award first appeared on Andrew Latreille Studio.