Stanley A. Milner Library wins prestigious IFLA Green Library Award

Congratulations to Teeple Architects’s Stanley A. Milner Library for winning the International Federation of Library Associations and Institutions (IFLA) Green Library Award.

View our gallery or head over to Teeple’s website to learn more.

The post Stanley A. Milner Library wins prestigious IFLA Green Library Award first appeared on Andrew Latreille Studio.