Clayton Water Reservoir granted AFBC Design Excellence Award

Clayton Water Reservoir by Local Practice Architecture + Design wins the Architecture Foundation of British Columbia Design Excellence Award. We’re proud to have photographed this unique project. View our images here or visit Local Practice Architecture + Design’s website to learn more.

The post Clayton Water Reservoir granted AFBC Design Excellence Award first appeared on Andrew Latreille Studio.